LIBRARY "ps4000a.dll"
EXPORTS
?ps4000aMaximumValueByRange@@YGIFPAF@Z
?ps4000aMinimumValueByRange@@YGIFPAF@Z
_ps4000aApplyFix@8
_ps4000aApplyFixEx@12
_ps4000aApplyResistanceScaling@28
_ps4000aCalibrateProbe@12
_ps4000aChangePowerSource@8
_ps4000aCheckForUpdate@16
_ps4000aCloseUnit@4
_ps4000aConnectDetect@12
_ps4000aConvertStreamingDataInternal@28
_ps4000aCurrentPowerSource@4
_ps4000aDeleteShadowCal@4
_ps4000aDeviceMetaData@24
_ps4000aEnumerateUnits@12
_ps4000aFlashLed@8
_ps4000aGetAccessoryInfo@24
_ps4000aGetAnalogueOffset@20
_ps4000aGetChannelInformation@24
_ps4000aGetCommonModeOverflow@8
_ps4000aGetDeviceResolution@8
_ps4000aGetMaxDownSampleRatio@20
_ps4000aGetMaxSegments@8
_ps4000aGetMaximumProbeValue@16
_ps4000aGetMinimumTimebaseStateless@20
_ps4000aGetNoOfCaptures@8
_ps4000aGetNoOfProcessedCaptures@8
_ps4000aGetStreamingLatestValues@12
_ps4000aGetString@16
_ps4000aGetTimebase2@24
_ps4000aGetTimebase@24
_ps4000aGetTimebaseStateless2@40
_ps4000aGetTimebaseStateless@44
_ps4000aGetTriggerTimeOffset64@16
_ps4000aGetTriggerTimeOffset@20
_ps4000aGetUnitInfo@20
_ps4000aGetValues@28
_ps4000aGetValuesAsync@32
_ps4000aGetValuesBulk@28
_ps4000aGetValuesOverlapped@28
_ps4000aGetValuesOverlappedBulk@32
_ps4000aGetValuesTriggerTimeOffsetBulk64@20
_ps4000aGetValuesTriggerTimeOffsetBulk@24
_ps4000aIsLedFlashing@8
_ps4000aIsReady@8
_ps4000aIsShadowCalTurnedOn@8
_ps4000aIsTriggerOrPulseWidthQualifierEnabled@12
_ps4000aMaximumValue@8
_ps4000aMemorySegments@12
_ps4000aMinimumValue@8
_ps4000aNearestSampleIntervalStateless@32
_ps4000aNoOfStreamingValues@8
_ps4000aOpenUnit@8
_ps4000aOpenUnitAsync@8
_ps4000aOpenUnitAsyncWithResolution@12
_ps4000aOpenUnitProgress@12
_ps4000aOpenUnitWithResolution@12
_ps4000aPingUnit@4
_ps4000aQueryOutputEdgeDetect@8
_ps4000aRegisterProbeLedColour@16
_ps4000aRunBlock@32
_ps4000aRunStreaming@36
_ps4000aRunStreamingInternal@40
_ps4000aSetBandwidthFilter@12
_ps4000aSetCalibrationPins@28
_ps4000aSetChannel@24
_ps4000aSetChannelLed@12
_ps4000aSetDataBuffer@24
_ps4000aSetDataBuffers@28
_ps4000aSetDeviceResolution@8
_ps4000aSetEts@20
_ps4000aSetEtsTimeBuffer@12
_ps4000aSetEtsTimeBuffers@16
_ps4000aSetFrequencyCounter@24
_ps4000aSetNoOfCaptures@8
_ps4000aSetOutputEdgeDetect@8
_ps4000aSetProbeInteractionCallback@8
_ps4000aSetProbeLedColour@12
_ps4000aSetProbeLedDefaults@8
_ps4000aSetPulseWidthQualifierConditions@16
_ps4000aSetPulseWidthQualifierProperties@20
_ps4000aSetSigGenArbitrary@68
_ps4000aSetSigGenArbitraryV2@92
_ps4000aSetSigGenBuiltIn@76
_ps4000aSetSigGenBuiltInV2@84
_ps4000aSetSigGenPropertiesArbitrary@44
_ps4000aSetSigGenPropertiesArbitraryV2@68
_ps4000aSetSigGenPropertiesBuiltIn@60
_ps4000aSetSigGenPropertiesBuiltInV2@68
_ps4000aSetSimpleTrigger@28
_ps4000aSetTriggerChannelConditions@16
_ps4000aSetTriggerChannelDirections@12
_ps4000aSetTriggerChannelProperties@20
_ps4000aSetTriggerDelay@8
_ps4000aSigGenArbitraryMinMaxValues@20
_ps4000aSigGenFrequencyToPhase@24
_ps4000aSigGenFrequencyToPhaseV2@24
_ps4000aSigGenSoftwareControl@8
_ps4000aStartFirmwareUpdate@8
_ps4000aStop@4
_ps4000aTurnShadowCal@8
_ps4000aWriteShadowCal@12
_ps4000aWriteShadowCalEx@12
ps4000aApplyFix
ps4000aApplyFixEx
ps4000aApplyResistanceScaling
ps4000aCalibrateProbe
ps4000aChangePowerSource
ps4000aCheckForUpdate
ps4000aCloseUnit
ps4000aConnectDetect
ps4000aConvertStreamingDataInternal
ps4000aCurrentPowerSource
ps4000aEnumerateUnits
ps4000aFlashLed
ps4000aGetAnalogueOffset
ps4000aGetChannelInformation
ps4000aGetCommonModeOverflow
ps4000aGetDeviceResolution
ps4000aGetMaxDownSampleRatio
ps4000aGetMaxSegments
ps4000aGetMaximumProbeValue
ps4000aGetNoOfCaptures
ps4000aGetStreamingLatestValues
ps4000aGetString
ps4000aGetTimebase
ps4000aGetTimebase2
ps4000aGetTimebaseStateless
ps4000aGetTimebaseStateless2
ps4000aGetTriggerTimeOffset
ps4000aGetTriggerTimeOffset64
ps4000aGetUnitInfo
ps4000aGetValues
ps4000aGetValuesAsync
ps4000aGetValuesBulk
ps4000aGetValuesOverlapped
ps4000aGetValuesOverlappedBulk
ps4000aGetValuesTriggerTimeOffsetBulk
ps4000aGetValuesTriggerTimeOffsetBulk64
ps4000aIsLedFlashing
ps4000aIsReady
ps4000aIsTriggerOrPulseWidthQualifierEnabled
ps4000aMaximumValue
ps4000aMemorySegments
ps4000aMinimumValue
ps4000aNoOfStreamingValues
ps4000aOpenUnit
ps4000aOpenUnitAsync
ps4000aOpenUnitAsyncWithResolution
ps4000aOpenUnitProgress
ps4000aOpenUnitWithResolution
ps4000aPingUnit
ps4000aQueryOutputEdgeDetect
ps4000aRegisterProbeLedColour
ps4000aRunBlock
ps4000aRunStreaming
ps4000aRunStreamingInternal
ps4000aSetBandwidthFilter
ps4000aSetCalibrationPins
ps4000aSetChannel
ps4000aSetChannelLed
ps4000aSetDataBuffer
ps4000aSetDataBuffers
ps4000aSetDeviceResolution
ps4000aSetEts
ps4000aSetEtsTimeBuffer
ps4000aSetEtsTimeBuffers
ps4000aSetFrequencyCounter
ps4000aSetNoOfCaptures
ps4000aSetOutputEdgeDetect
ps4000aSetProbeInteractionCallback
ps4000aSetProbeLedColour
ps4000aSetProbeLedDefaults
ps4000aSetPulseWidthQualifierConditions
ps4000aSetPulseWidthQualifierProperties
ps4000aSetSigGenArbitrary
ps4000aSetSigGenArbitraryV2
ps4000aSetSigGenBuiltIn
ps4000aSetSigGenBuiltInV2
ps4000aSetSigGenPropertiesArbitrary
ps4000aSetSigGenPropertiesArbitraryV2
ps4000aSetSigGenPropertiesBuiltIn
ps4000aSetSigGenPropertiesBuiltInV2
ps4000aSetSimpleTrigger
ps4000aSetTriggerChannelConditions
ps4000aSetTriggerChannelDirections
ps4000aSetTriggerChannelProperties
ps4000aSetTriggerDelay
ps4000aSigGenArbitraryMinMaxValues
ps4000aSigGenFrequencyToPhase
ps4000aSigGenFrequencyToPhaseV2
ps4000aSigGenSoftwareControl
ps4000aStartFirmwareUpdate
ps4000aStop
